France
Ultralight
900
707
101
889.147
0
0
0
0
7.69744
20000
1
0
0
0
0
0
0
0
-0.3
1.2
1
937.411
712.94
1
Ultralight
1
126.365
217.474
-25.9829
1.60495
0.0836003
0.0247216
30.7098
1
0
0
6
gull
gull
gull
gull
gull
gull
